-- Migration: 000001_initial_schema (rollback)
-- Description: Drop all tables and indexes created in the initial schema migration
-- Author: Hex
-- Date: 2026-05-06

BEGIN;

DROP TABLE IF EXISTS usage_logs        CASCADE;
DROP TABLE IF EXISTS print_jobs        CASCADE;
DROP TABLE IF EXISTS filament_spools   CASCADE;
DROP TABLE IF EXISTS printers          CASCADE;
DROP TABLE IF EXISTS settings          CASCADE;
DROP TABLE IF EXISTS material_modifiers CASCADE;
DROP TABLE IF EXISTS material_finishes  CASCADE;
DROP TABLE IF EXISTS material_bases     CASCADE;
DROP TABLE IF EXISTS job_statuses       CASCADE;
DROP TABLE IF EXISTS printer_types      CASCADE;

COMMIT;
